
drop table if exists `iot_websocket_msg`;
CREATE TABLE `iot_websocket_msg` (
         `id` varchar(125) COLLATE utf8mb4_general_ci NOT NULL COMMENT '消息id',
         `event` varchar(125) COLLATE utf8mb4_general_ci DEFAULT NULL COMMENT '事件类型',
         `org_id` bigint DEFAULT NULL COMMENT '机构id',
         `org_name` varchar(255) COLLATE utf8mb4_general_ci DEFAULT NULL COMMENT '机构名称',
         `iot_code` varchar(255) COLLATE utf8mb4_general_ci DEFAULT NULL COMMENT '目标主机',
         `server_name` varchar(255) COLLATE utf8mb4_general_ci DEFAULT NULL COMMENT '主机名称',
         `status` int DEFAULT NULL COMMENT '消息状态;0:处理中,1:处理完成,2:重试中,3:重试成功,4:重试失败',
         `receive_content` longtext CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci COMMENT '收到消息内容',
         `reply_content` text COLLATE utf8mb4_general_ci COMMENT '回复内容',
         `ready_send_time` datetime DEFAULT NULL COMMENT '准备发送时间',
         `really_send_time` datetime DEFAULT NULL COMMENT '重试成功时间',
         `fire_time` datetime DEFAULT NULL COMMENT '触发时间',
         `max_retry_times` int DEFAULT NULL COMMENT '最大重试次数',
         `cur_retry_times` int DEFAULT NULL COMMENT '当前重试次数',
         `retry_interval` int DEFAULT NULL COMMENT '重试间隔,分钟',
         `create_time` datetime DEFAULT NULL COMMENT '创建时间',
         `update_time` datetime DEFAULT NULL COMMENT '最后一次修改时间',
         PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_general_ci;