
SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for core_announcement_notification
-- ----------------------------
DROP TABLE IF EXISTS `sync_fjnx_org_move`;
CREATE TABLE `sync_fjnx_org_move` (
  `id` bigint NOT NULL AUTO_INCREMENT,
  `org_code` varchar(64) CHARACTER SET utf8mb4 COLLATE utf8mb4_general_ci DEFAULT NULL COMMENT '需要移动到自定义机构下的机构编码',
  `org_type` int DEFAULT NULL COMMENT '1: 部门 2： 机构 ',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE=InnoDB AUTO_INCREMENT=98 DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_0900_ai_ci COMMENT='配置特殊的机构和部门机构，决定是否要移动到机关机构下';

-- ----------------------------
-- Records of core_announcement_notification
-- ----------------------------


SET FOREIGN_KEY_CHECKS = 1;
